         180           8
   3.71681589257723        3.47968239220529        3.30588841803563     
   3.11727900879710        3.03658318925657        2.99351342464881     
   2.92113859871490        2.79223635505921     
  -11.0056267627402       -11.0238666833311       -11.0182501017818     
  -10.9623538768725       -10.6611250030131       -10.3476020367120     
  -10.0776660732854       -9.82990238470202     
 -9.350167517282373E-003  0.000000000000000E+000
   1.00924726941579       0.000000000000000E+000
   1.01370200972265       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
