         180           3
   8.80911013132857        10.3653445847876        11.9368721480317     
  -10.5468259149122       -10.2079475419667       -9.12619354994572     
  1.071272322847351E-003  0.000000000000000E+000
  0.987136281145420       0.000000000000000E+000
  0.984367659327640       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
