         180           8
   6.51004469590790        6.31039597748668        6.14526950031380     
   5.96995176489363        5.84140209782955        5.73484960550038     
   5.61391884766542        5.57692679541169     
  -11.3385728543474       -11.3758608290521       -11.2803388761136     
  -11.1389094893777       -10.9595962341854       -10.7505763351571     
  -10.5647746885332       -10.3854293670001     
 -9.260755425851417E-003  0.000000000000000E+000
   1.00919150774366       0.000000000000000E+000
   1.01399501262613       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
