         180           3
   8.46957402704340        6.85977867399278        5.88512729339126     
  -10.6691721896074       -9.88895432658195       -9.36056682641107     
  1.049461265351723E-003  0.000000000000000E+000
  0.986240407646007       0.000000000000000E+000
  0.983302780906117       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
