         180           8
   5.86518101389067        5.42050882566172        5.01725522502406     
   4.68666066971733        4.44044506517132        4.18202278811492     
   3.83786904634583        3.71649421605165     
  -12.0959039968104       -12.2390891346241       -12.2401710212333     
  -12.2659294682594       -12.2647705043941       -12.2828823481575     
  -12.2369899174710       -12.2195413522867     
 -9.000957994602394E-003  0.000000000000000E+000
   1.00865586364295       0.000000000000000E+000
   1.01309423760894       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
