         180           3
   11.4172250259298        9.02312751890351        6.94027080665202     
  -10.4105925410112       -11.2624997037198       -13.0842757566787     
  1.820740613904132E-003  0.000000000000000E+000
  0.986416216486344       0.000000000000000E+000
  0.983578809376766       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
