         180           8
   12.7587325748299        12.3510048963462        12.1161980086449     
   11.8174474776526        11.5872455181768        11.4850087539419     
   11.4343391730118        11.6434202404574     
  -12.1460054844978       -12.3725997083925       -12.6637421843344     
  -13.1292441605690       -13.6710906954926       -14.2745485360789     
  -14.8619164277626       -15.0516281072591     
 -8.941256796841601E-003  0.000000000000000E+000
   1.00918558299411       0.000000000000000E+000
   1.01338049992072       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
