         180           8
   11.2482926710865        11.0670947832488        10.8621404104245     
   10.6455127001290        10.3980033311088        10.1158484406283     
   9.82029504302297        9.59079194639292     
  -13.2698415103910       -13.0161928733595       -12.8017272665574     
  -12.5956934820442       -12.4407662262084       -12.1984598429006     
  -11.8579457596252       -11.4785496510653     
 -9.034685908133234E-003  0.000000000000000E+000
   1.00925577824283       0.000000000000000E+000
   1.01373245176850       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
