         180           3
   17.0605477206547        14.3411314707553        11.4194105557817     
  -7.92295684071107       -8.11068961082605       -8.91971615507150     
  9.850312690400339E-004  0.000000000000000E+000
  0.987095702576897       0.000000000000000E+000
  0.984384253857983       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
