         180           8
   9.50050543285320        8.85029461341927        8.13712134658090     
   7.48161434025572        6.82131189611673        6.20783812399430     
   5.61755358176119        5.04404376806729     
  -9.85044831566536       -9.77117472087243       -9.73793700416475     
  -9.80187728704417       -10.0041473070532       -10.1946499937458     
  -10.3570818298176       -10.6231822556312     
 -9.325137781534897E-003  0.000000000000000E+000
   1.00933225568622       0.000000000000000E+000
   1.01339420969827       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
