         180           8
   13.5181332735009        12.7955512278291        12.1318018741154     
   11.4312105022123        10.7160150634112        10.0046412762548     
   9.31311688761440        8.68802686300927     
  -10.8044474948570       -10.7867194001765       -10.8042294168283     
  -10.8082486538496       -10.8272375543036       -10.8817814786677     
  -10.9352133750007       -11.0053898554319     
 -9.344620960629532E-003  0.000000000000000E+000
   1.00926819288964       0.000000000000000E+000
   1.01396190594773       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
