         180           8
   8.26177861210893        7.61184206796258        6.93586157908478     
   6.25290650129143        5.60605972256769        4.96103848019510     
   4.30090501862509        3.68548062542739     
  -9.17409523903562       -9.25252869495867       -9.32840158819387     
  -9.42289758948833       -9.44678311768785       -9.43060948854336     
  -9.45191463291452       -9.45485524598907     
 -9.392055873810392E-003  0.000000000000000E+000
   1.00917914698688       0.000000000000000E+000
   1.01358402813893       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
