         180           8
   7.28027569282322        6.67291665976343        6.01034057943396     
   5.34378908692981        4.65133931630727        4.00392685211227     
   3.35579947890885        2.76880142837596     
  -9.01498006558092       -9.01108103565815       -9.02676412156358     
  -9.04177090936011       -9.07089893299894       -9.13446632724404     
  -9.17914944849163       -9.26290872818669     
 -9.492797191613432E-003  0.000000000000000E+000
   1.00913827547869       0.000000000000000E+000
   1.01360478360922       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
