         180           8
   8.94547202033623        8.25000507980951        7.51054391394326     
   6.81939335919897        6.14773717395427        5.47917544476435     
   4.80109197320605        4.17953754040637     
  -9.52735154666562       -9.47142411703932       -9.50571856206711     
  -9.55978785264497       -9.58038234135776       -9.64495017475629     
  -9.74264200616377       -9.77234428543193     
 -9.511935430212245E-003  0.000000000000000E+000
   1.00932194362699       0.000000000000000E+000
   1.01403510418514       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
