         180           8
   7.96893074054290        7.22469444216229        6.47900547751744     
   5.76474520213915        5.18067649125632        4.60842562268748     
   3.98104980537669        3.43794508034631     
  -9.59873255222994       -9.56808696811583       -9.60530929428306     
  -9.74008056753105       -9.91598655063281       -10.0944871883761     
  -10.1499531743860       -10.1621442633040     
 -9.600918778731302E-003  0.000000000000000E+000
   1.00961403870498       0.000000000000000E+000
   1.01412737984832       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
