         180           8
   4.64120916027867        4.39014379508957        4.23677315033160     
   4.10354430731933        3.93375075803687        3.82948556605999     
   3.76833305187113        3.57630449591122     
  -10.1799503833475       -9.99142120942688       -9.83173210231327     
  -9.63464236798901       -9.45272655538221       -9.24573146558345     
  -8.99561362915504       -8.79983197570598     
 -9.328905372119353E-003  0.000000000000000E+000
   1.00936494069165       0.000000000000000E+000
   1.01336528003151       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
