         180           8
   6.29247201991147        6.06679295059652        5.88594622021525     
   5.70047592769153        5.52718901546658        5.36392745733666     
   5.25501228951014        5.19830021206391     
  -10.6371539789379       -10.4794308156300       -10.3346819863101     
  -10.1830700478607       -9.96862899640816       -9.70896018510231     
  -9.51672428673939       -9.37566628365838     
 -9.213472718451172E-003  0.000000000000000E+000
   1.00919785634865       0.000000000000000E+000
   1.01375622510915       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
