         180           8
   4.91552626898839        4.67492308511349        4.47595044177803     
   4.26453323824183        4.10826113693096        3.96386126979116     
   3.76501081125721        3.50817302453531     
  -11.0110833787517       -10.7826610497299       -10.5881196666956     
  -10.3737827499487       -10.1619851586181       -9.94840479766408     
  -9.71699274926007       -9.54491549297441     
 -9.476344365041984E-003  0.000000000000000E+000
   1.00950865513970       0.000000000000000E+000
   1.01350602456268       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
