           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -4.018132026864506E-004  0.000000000000000
   0.989033189674442  0.000000000000000
   0.992035327202456  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
