          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.571586811547707E-003  0.000000000000000
   1.00233696186444  0.000000000000000
   0.999223932106311  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
