          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -4.342790277447063E-004  0.000000000000000
   0.989025465029832  0.000000000000000
   0.991872032840797  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
