           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.610889145246041E-003  0.000000000000000
   1.00235859103376  0.000000000000000
   0.999125744894454  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
