           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.368301241897940E-003  0.000000000000000
   1.00310959135354  0.000000000000000
   0.999953158333366  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
