           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.654521891076525E-004  0.000000000000000
   0.989073653024068  0.000000000000000
   0.991802149561151  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
