           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.083441975219940E-003  0.000000000000000
   0.999025927044606  0.000000000000000
   0.998075068688291  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
