           8           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.262255704038981E-003  0.000000000000000
   1.00236177694655  0.000000000000000
   0.999307747651241  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
