           8           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.166785799838803E-004  0.000000000000000
   0.989290341147719  0.000000000000000
   0.992223277421355  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
