           8           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.231932617838546E-003  0.000000000000000
   1.00071605310651  0.000000000000000
   0.999977308342512  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
