           8           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -3.545984209741288E-004  0.000000000000000
   0.989321777283071  0.000000000000000
   0.992248640686253  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
