           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.531672731511266E-003  0.000000000000000
   1.00225974821141  0.000000000000000
   0.999543457527935  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
