           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -4.642448460220607E-004  0.000000000000000
   0.989453328400719  0.000000000000000
   0.992441867044139  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
