           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -9.849348597283583E-004  0.000000000000000
   1.00244654655321  0.000000000000000
   0.999740783257320  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
