           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -3.569860249698745E-004  0.000000000000000
   0.989828561321898  0.000000000000000
   0.992496854353064  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
