           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.213210365733446E-003  0.000000000000000
   1.00247709491833  0.000000000000000
   0.999487679891656  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
