           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -3.143956566224788E-004  0.000000000000000
   0.989502414716328  0.000000000000000
   0.992572744685676  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
