           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.095946547691130E-003  0.000000000000000
   1.00237853861004  0.000000000000000
   0.999696845590272  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
