           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -3.668558312283050E-004  0.000000000000000
   0.989293809834894  0.000000000000000
   0.992262403136745  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
