           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.160970121965865E-003  0.000000000000000
   1.00253313063169  0.000000000000000
   0.999654095179947  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
