           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -4.407972715211742E-004  0.000000000000000
   0.989841904096620  0.000000000000000
   0.992667838687193  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
