          22           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.191728164938159E-003  0.000000000000000
   1.00206988657023  0.000000000000000
   0.999347856056511  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
