          22           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -5.233306484810608E-005  0.000000000000000
   0.988668705658634  0.000000000000000
   0.991569623116517  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
