           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.430887474010045E-003  0.000000000000000
   1.00219257673494  0.000000000000000
   0.999139997952652  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
