           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.255449178070704E-004  0.000000000000000
   0.988858820709232  0.000000000000000
   0.991752621696520  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
