           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.709865662448615E-003  0.000000000000000
   1.00197094699369  0.000000000000000
   0.998954639798984  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
