           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.462938967976692E-003  0.000000000000000
   1.00246336070355  0.000000000000000
   0.998963263532220  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
