           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.575198056782098E-003  0.000000000000000
   1.00208991302157  0.000000000000000
   0.999102961744976  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
