           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.594692630827117E-004  0.000000000000000
   0.989006050870739  0.000000000000000
   0.991966928650198  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
