           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.367335862468898E-003  0.000000000000000
   1.00218510663133  0.000000000000000
   0.999254512209890  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
