           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.527714627151604E-004  0.000000000000000
   0.988748533569114  0.000000000000000
   0.991682973996422  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
