           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.284219589149919E-003  0.000000000000000
   1.00232165750371  0.000000000000000
   0.999310361432080  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
